From bffaceb579ba66ba675f5b99e93258423b3c97ab Mon Sep 17 00:00:00 2001
From: Filip Gawin <filip.gawin@zoho.com>
Date: Tue, 29 Dec 2020 18:53:36 +0100
Subject: Remove sdk

---
 sdk/rwsdk/include/d3d8/errcom.def | 60 ---------------------------------------
 1 file changed, 60 deletions(-)
 delete mode 100644 sdk/rwsdk/include/d3d8/errcom.def

(limited to 'sdk/rwsdk/include/d3d8/errcom.def')

diff --git a/sdk/rwsdk/include/d3d8/errcom.def b/sdk/rwsdk/include/d3d8/errcom.def
deleted file mode 100644
index 25f44e1e..00000000
--- a/sdk/rwsdk/include/d3d8/errcom.def
+++ /dev/null
@@ -1,60 +0,0 @@
-RWECODE(E_RW_BADENGINESTATE,
-        "Engine in incorrect state for this operation")
-RWECODE(E_RW_BADOPEN,
-        "Error opening the file %s")
-RWECODE(E_RW_BADPARAM,
-        "Invalid Parameter passed. %s")
-RWECODE(E_RW_BADVERSION,
-        "The binary file format version is incompatible with this library")
-RWECODE(E_RW_DEBUGSTACK,
-        "Debug Library has Stack Depth mismatch")
-RWECODE(E_RW_DEFAULTPIPELINECREATION,
-        "Creation of a default pipeline (%s) failed")
-RWECODE(E_RW_FRAMENOMATRIX,
-        "The frame does not have an associated matrix")
-RWECODE(E_RW_INVIMAGEDEPTH,
-        "Invalid Image Depth")
-RWECODE(E_RW_INVIMAGEFORMAT,
-        "Image has no pixel memory allocated")
-RWECODE(E_RW_INVIMAGEMASK,
-        "The mask and image are not the same size")
-RWECODE(E_RW_INVIMAGESIZE,
-        "Destination and source images are of differing sizes")
-RWECODE(E_RW_INVRASTERDEPTH,
-        "Invalid Raster depth")
-RWECODE(E_RW_INVRASTERFORMAT,
-        "Unrecognized raster format")
-RWECODE(E_RW_INVRASTERLOCKREQ,
-        "Invalid Raster lock request")
-RWECODE(E_RW_INVRASTERMIPLEVEL,
-        "Invalid Raster mipmap level")
-RWECODE(E_RW_INVRASTERSIZE,
-        "Invalid Raster size")
-RWECODE(E_RW_INVRASTERUNLOCKREQ,
-        "Invalid Raster unlock request")
-RWECODE(E_RW_NOFRAME,
-        "Unable to find Frame")
-RWECODE(E_RW_NOMEM,
-        "Unable to allocate %d bytes of memory")
-RWECODE(E_RW_NOMIPMAPGENERATIONCALLBACK,
-        "No Mipmap generation callback set - use RtMipmapUseDefaultMipmapGenerationCallback")
-RWECODE(E_RW_NOTSSEENABLEDCPU,
-        "Not SSE enabled CPU")
-RWECODE(E_RW_NULLP,
-        "NULL pointer passed to library routine")
-RWECODE(E_RW_PLUGININIT,
-        "Plugin has already been initialized")
-RWECODE(E_RW_PLUGINNOTINIT,
-        "Plugin not initialized")
-RWECODE(E_RW_RANGE,
-        "A supplied parameter was outside the expected range")
-RWECODE(E_RW_READ,
-        "Read error on stream")
-RWECODE(E_RW_REDUNDANT_FUNCTION,
-        "Call to redundant function - scheduled to be dropped from future releases")
-RWECODE(E_RW_WRITE,
-        "Write error on stream")
-RWECODE(E_RX_MESHES_RANGES_OVERLAP,
-	"\n    Geometry is in an invalid format for RxPipeline rendering.\n    There may be visible artifacts and/or decreased performance.\n    Use RpGeometrySortByMaterial.\n    [stream %p type %s]")
-RWECODE(E_RW_STRING_TRUNCATION,
-        "strlen(%s) >= %d; truncating at character #%d  == %c")
-- 
cgit v1.2.3

